ABEND CERN Program Library Z035 Author(s) : B. Lautrup, R. Matthews Library: KERNLIB Submitter : C. Letertre Submitted: 06.01.1971 Language : Fortran or Assembler or C Revised: 20.01.1986 Abnormal Termination of Fortran Programs

ABEND causes abnormal termination of a program. (On CDC all subsequent JCL control cards up to the next
EXIT card will be ignored by the system).

Structure:

SUBROUTINE subprogram

User Entry Names: ABEND Usage:

Not IBM:

CALL ABEND

causes abnormal termination of execution and prints the day^le message ABEND. The output ^les are closed and INPUT is correctly positioned. IBM:

CALL ABEND(KODEU)

The optional argument KODEU is used as the user completion code and must be an integer expression with a value in the range 0 � 4095. If the argument is omitted, or does not have a value in this range, a default value of 1 will be used. ffl

1 Z035 Ű 1