UZERO CERN Program Library V300 Author(s) : J. Zoll Library: KERNLIB Submitter : C. Letertre Submitted: 01.03.1968 Language : Fortran or Assembler Revised: 16.09.1991 Preset Parts of an Array These routines ^ll each word of an array with zero, ’blank’, or a quantity given in the argument list. Structure:

SUBROUTINE subprograms

User Entry Names: UBLANK, UZERO, UFILL Usage:

Required 0 ¡ J1 ˇ J2.

CALL UZERO(A,J1,J2)

sets A(J1) until A(J2) to zero.

CALL UBLANK(A,J1,J2)

sets A(J1) until A(J2) to BCD blank.

CALL UFILL(A,J1,J2,STUFF)

loads A(J1) until A(J2) with the contents of STUFF. ffl

1 V300 Ű 1