PAW CERN Program Library Q121 Author(s) : R. Brun, O. Couet, N. Cremel, A. Nathaniel, A. Rademakers, C. Vandoni Library: Submitter : R. Brun Submitted: 10.02.1988 Language : Interactive Revised: 01.11.1994 PAW - Physics Analysis Workstation Package

PAW is a program package to assist physicists in the analysis and presentation of their data. It provides

interactive graphical presentation and statistical or mathematical analysis, working on objects familiar to physicists like histograms, event ^les (n-tuples) and vectors. The PAW++ program provides a Motif interface to PAW. Structure:

Interactive data analysis program. Usage:

See Long write-up. Notes:

The packages involved in the implementation of PAW and the platform availability are described in the Reference Manual. ffl

1 Q121 Ű 1