IUWEED CERN Program Library N103 Author(s) : C. Letertre Library: KERNLIB Submitter : J. Zoll Submitted: 01.09.1969 Language : Fortran or Assembler Revised: 15.09.1991 Detect Inde�nite and In�nite in an Array

IUWEED scans a vector and returns the address of the ^rst quantity which is either ’inde^nite’ or ’in^nite’.

Structure:

FUNCTION subprogram

User Entry Names: IUWEED Usage:

IW = IUWEED(IVEC,N)

sets IW to the relative address, in the N element vector IVEC, of the ^rst element containing either an ’indefinite’ or ’in^nite’. IW = 0 if there are no such elements. IVEC is not changed. ffl

1 N103 Ű 1