EPIO CERN Program Library I101

Author(s) : H. Grote, I. McLaren Library: PACKLIB Submitter : Submitted: 01.12.1981 Language : Fortran, Assembler Revised: 01.02.1982 EP Standard Format Input/Output Package

The EP format off-line package is intended to be used for all data (at least on tape) in an experiment, in such a way that from the raw data tape to the DST, the tape (or ^le) format is identical. This makes the transport of data between computers easier, and simpli^es the task of passing the ^les or tapes at different stages of the production chain through any other part of the production chain. EPIO is designed to make almost all features of the very ~exible EP format available to the user.

Structure:

SUBROUTINE package

User Entry Names: EPINIT, EPREAD, EPOUTS, EPOUTL, EPCLOS, EPRWND, EPDROP, EPEND,

EPUREF, EPGETW, EPGETA, EPGETC, EPSETW, EPSETA, EPSETC, EPADDH,
EPUPDH, EPSTAT

Files Referenced: User de^ned External References: UZERO (V300), UCOPY (V301), IOPACK (Z300) (IBM only)

COMMON Block Names and Lengths: /EPCOMM/ 136

Usage:

See Long Write-up. ffl

1 I101 Ű 1